-- 门店房间表：供预约等业务按门店选择房间使用
-- 执行前请确认库名；与 lq_mdxx.F_Id 关联

CREATE TABLE IF NOT EXISTS `lq_md_room` (
  `F_Id` varchar(50) NOT NULL COMMENT '主键',
  `F_StoreId` varchar(50) NOT NULL COMMENT '门店ID，关联 lq_mdxx.F_Id',
  `F_RoomName` varchar(64) NOT NULL COMMENT '房间名称',
  `F_SortNo` int NOT NULL DEFAULT 0 COMMENT '排序号，越小越靠前',
  `F_Enabled` tinyint NOT NULL DEFAULT 1 COMMENT '1启用 0停用',
  `F_RoomType` int NOT NULL DEFAULT 9 COMMENT '房间类型，见 LqStoreRoomTypeEnum',
  `F_Capacity` int DEFAULT NULL COMMENT '可容纳人数（预约参考，可空）',
  `F_Remark` varchar(500) DEFAULT NULL COMMENT '备注',
  `F_CreateTime` datetime NOT NULL COMMENT '创建时间',
  `F_LastModifyTime` datetime DEFAULT NULL COMMENT '最后修改时间',
  PRIMARY KEY (`F_Id`),
  KEY `IX_lq_md_room_F_StoreId` (`F_StoreId`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='门店房间';
