<template>
	<view class="page">
		<pyh-nv ref="nv" :config="nvConfig"></pyh-nv>
		<view class="listBox" :style="{'padding-top':(pageTop+'px')}">
			<web-view :src="qw"></web-view>
<!-- 			<view class="content">
				<view class="topimg"><image src="../../static/img/02.jpg" mode="widthFix"></image></view>

				<view class="message-list">
					<view class="titleall-box">
						<view class="titleall-left"><view class="titleall-left-line"></view>监控信息</view>
					</view>
					<view class="list">
						<view class="icon-data">
							<view class="data">
								<view class="title">
									<text>监控位置</text>
								</view>
							</view>
						</view>
						<view class="more">
							<text>仁寿县景观兴城13栋1308客厅</text>
						</view>
					</view>
					<view class="list">
						<view class="icon-data">
							<view class="data">
								<view class="title">
									<text>监控对象</text>
								</view>
							</view>
						</view>
						<view class="more">
							<text>蒋涵越</text>
						</view>
					</view>
				</view>
		
			</view> -->
		</view>
	</view>
</template>

<script>
	export default {
		data() {
			return {
				qw:'https://antis6.sherkxuan.cn/demo/miniindex.html?12&666',
				nvConfig:{
					title:"动态监控",
					bgColor:"#ffffff",
					color:"#000000",
					fixedAssist:{
						hide:true,
					},
				},
			}
		},
		onPageScroll(e) {this.$refs.nv.pageScroll(e)},
		computed:{
			pageTop(){return parseInt(88*uni.getSystemInfoSync().windowWidth/750) + uni.getSystemInfoSync().statusBarHeight}
		},
		onLoad() {
		},
		methods:{
		}
	}
</script>

<style scoped lang="scss">
	@import 'minorcontrol.scss';
</style>
